Copyright: © Copyright Agilent Technologies, 2000, 2001


This roadmap contains links to the documentation supplied with your Agilent 89600 Vector Signal Analyzer. To learn about a document, click its link (below).

	Agilent 89600 Web Page

…………………………………………………………………..

	Getting Started
	Installation, Licensing, and Hardware Setup

…………………………………………………………………..

	Product Overview
	89600-Series Applications
	Tutorial

…………………………………………………………………..

	Sharing Data With Other Products & Applications

…………………………………………………………………..

	Programming with the COM API
	Writing macros

…………………………………………………………………..

	Optional Software

…………………………………………………………………..

	Reference

…………………………………………………………………..

	VSA Concepts
	Troubleshooting
	Product and Application Notes


Web Page
  Go to Agilent 89600 Web Page Now!

The Agilent 89600 web page contains timely information, such as new product information, last-minute updates to product documentation, frequently asked questions, and configuration information.

To launch your Internet browser and open the Web Page, click the above link, or point your web browser to:

http://www.agilent.com/find/89600


 Open This Book

If you are new to the Agilent 89600-Series products, a good place to begin is the Getting Started online help.  This online help tells you how to run the Getting Started online video that demonstrates product features and also includes a brief introduction to the Windows user-interface used by Agilent 89600-series products.


 Open This Book

This book is an online tutorial that begins with a high-level look at 89600-series products and ends by showing you how to analyze measurement results and link them to other design tools.  The tutorial is, in effect, an online training course—it consists of selected information from the entire 89600-series documentation set.


 Open This Book

This book teaches you how to share data with other products and applications.  You will learn:

•	The types of data you can save and recall (CSV).

•	How to save and recall MATLAB data.

•	How to save and recall data from the Agilent 89441 Vector Signal Analyzer.

•	How to save and recall SDF (Standard Data Format) data.

•	How to save trace data and import into other MS Office products (such as MS Excel).


 Open This Book

This book teaches you how to program the analyzer using the analyzer's COM API.  It includes:

•	An overview of the COM API.

•	The COM API function reference.

•	Sample programs.


 Open This Book

This book includes:

•	A link to the online Installation Guide (PDF file) which tells you how to install 89600-series products.

•	A section that tells you how to obtain, install, and transfer software licenses for the 89600-Series VSA software.

•	Hardware setup information, including cabling diagrams.


 Open This Book

This book contains concepts you may need when making measurements with the Agilent 89600 Vector Signal analyzer, such as:

•	An overview of swept and vector-signal analyzers.

•	How 89600-series analyzers differ from conventional analyzers.

•	A conceptual overview of time-domain and frequency-domain measurements.

•	Concepts related to RBW (resolution bandwidth), video filtering, frequency span, bandwidth coupling, display resolution.

•	Using windows to overcome effects such as leakage when making spectral measurements.


 Open This Book

This book contains an overview of many concepts related to VXI, and covers topics such as:

•	VXI

•	VXIbus

•	HP-IB

•	SCPI Programming Language

•	VXIplug&play

•	External Interfaces

•	Embedded and External Controllers


 Open This PDF File

This book is an online PDF file for the Agilent 89600-Series Installation Guide that ships with 89600-series analyzers.

This book shows you how to install, configure, and calibrate Agilent 89600-series Vector Signal Analyzers.


 Open This Book

This book describes the components and options for the Agilent 89600-series product line. It includes product information and simplified block diagrams for the Agilent 89610 and 89640 Vector Signal Analyzers, plus information about each VXI hardware module used in each analyzer.


 Open This Book

This book describes the two applications that make up the 89600-series VSA software: the Spectrum Analyzer application and the Vector Signal Analyzer application.  It also includes information about running multiple applications.


 Open This Book

This book contains online reference-information for the standard set of features in Agilent 89600-series VSA software products.  The online help in this book describes the screens, menus, and dialog boxes that you use to make measurements with the VSA software (you can also display this help by clicking the HELP button or pressing F1 while using the analyzer).


 Open This Page

This page contains a list of common Product Notes and Application Notes.  These selected notes are available online as PDF files and contain product information and applications specific to 89600-series analyzers.


 Open This Book

This book teaches you how to use the analyzer's macro programming language.


 Open This Book

This book contains troubleshooting information and a description of common error and status messages that you may encounter when using 89600-series products.


 Open This Book

This book documents the following options available for the 89600-series VSA software:

•	Option AYA, Digital Demodulation

•	Option 105, which adds connectivity to Agilent's EESof/ADS (Advanced Design System)

•	Option B7N 3G Modulation Analysis, which allows you to demodulate these types of signals:

−	1xEV-DO First Evolution - Data Only

−	TD-SCDMA System for Mobile (TSM)

−	cdma2000 Code Domain Multiple Access 2000

−	W-CDMA Wideband Code Domain Multiple Access (3GPP)

•	Option B7R W-LAN Modulation Analysis, which allows you to demodulate these types of signals

−	WLAN-OFDM 802.11a and HIPERLAN/2 Modulation Analysis: Orthogonal Frequency Division Multiplexing (OFDM)

−	WLAN-DSSS/CCK/PBCC IEEE Std 802.11b and for IEEE Std 802.11g: Direct Spread Sequence Spectrum (DSSS) analysis


How To Use This Help File

To do this...	Click...
Display or hide the navigation pane (Contents, Index, and Search tabs)...
Display the documentation roadmap...
Browse through the online topics...
View the Table of Contents…
Display the online help index...
Search for a word...
Display a history of topics that you’ve visited…
To print a single topic...
To print an entire Book…	(in the Table of Contents)
To change the displayed font size…


Acknowledgements

The following products are mentioned in one or more places in the Agilent 89600-series documentation.

Product	Acknowledgement
Adobe® and Acrobat®	These products are trademarks of Adobe Systems Incorporated.
Microsoft®, Windows NT®, Windows®, and MS Windows®	These products are U.S. registered trademarks of Microsoft Corporation.
MS Excel, MS Word, MS Office, VBScript	These products are products of Microsoft Corporation.
MATLAB	MATLAB is a product of The MathWorks, Inc.


The Documentation Roadmap is not installed on your system.


1999-2002, Agilent Technologies


This documentation is not installed on your system.


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .